GND

1610KU122

ATP71A27P1

118A27P1

117A27P1

116A27P1

115A27P1

114

100pf

C3821

-+LM139

U38131011ABCDOEYAYBYCYD54HC244

U717151311193579ABCDOEYAYBYCYD54HC244

U61715131119357954HC08

U59891054HC08

U59111213

4.99K

R12124.99K

R1112

A27P1

133A27P1

182220220U53710220U53611-+LM139

U34131011+5V220U5389220U53314220U53413220U5316220U53215ABCDOEYAYBYCYD54HC244

U1246818161412ABCDOEYAYBYCYD54HC244

U2246818161412ABCDOEYAYBYCYD54HC244

U24246818161412ABCDOEYAYBYCYD

54HC240

U311131517199753+5V+5V

R1810.2K

1N4150

CR20

121N4150

CR59

12

5VUS

CR58

CR60

+5V

CR13

CR61

+5VA27P1

113A27P1

206A27P1

112A27P1

111ABCDOEYAYBYCYD

U1111131517199753ABCDOEYAYBYCYD

U11246818161412ABCDOEYAYBYCYD

U3246818161412ABCDOEYAYBYCYD54HC244

U23246818161412+5VU489

CR57

CR21

ABCDOEYAYBYCYD54HC244

SPARE1

17151311193579

1N5711

CR17

U117151311193579142A27P1

204470U44314

CR27

470U45512

CR29

CR28

CR112

CR7121N5711

CR12

128A27P1

161A27P1

187A27P1

64A27P1

181470U4416470U45611470U44413470U44215A27P1

195+5V-+LM139

U21131011U41011-+LM139

U161489-+LM139

U15131011+5V+5V+5V+5V+5V470U45215470U45413470U4589470U4516A27P1

183A27P1

134A27P1

65A27P1

1275VUS

50A27P1

164470U45710

CR4121N4150

CR512

119

CR63

205470U453145VUS

CR64

246818161412ABCDOEYAYBYCYD54HC244

U217151311193579

CR31

U16131011

CR30

U151489

CR612

163A27P1

191A27P1

178A27P1

176U521U543U565U589U1989U1965U1943U192100KU48611+5V

162.7K

U185

510K

U17512GND

1610KU3212

100K

U47512A27P1

123A27P1

120A27P1

121A27P1

122GND

1610KU3210

U47611100K

U48512510K

U17611+5V

U1861N5711

CR11

12120U46512

1610KU329100pf

C492120U46611

1610KU3211

U31245

CR9121N5711

CR33

U187

U17710100K

U47710A27P1

124A27P1

125GND

1610KU3214

U48710

C572120U46710

1610KU3213

U31167

CR32

121N5711

CR34

U188

U1789100K

U4789A27P1

126A27P1

42100K

U4889

C482120U4689

1610KU3215

U311489-+LM139

U31131011GND

1610KU327120U46413100pf

C5221

U48413GND

1610KU328

57A27P1

56100K

U47413510K

U17413+5V

U1841N5711

CR35

CR36

U33131011GND

1610KU325120U46314100pf

C5121

U48314GND

1610KU326

55A27P1

54100K

U47314510K

U17314+5V

U1831N5711

CR65

CR67

U331489GND

1610KU323120U46215100pf

C502100pf

C3621

1610KU321

U33167GND

1610KU395

47A27P1

46

120U37314

U52314100K

U51314+5V

U223

U38167

CR41

CR40

CR39

U33245A27P1

58+5V

U228

U36314510K

U3689100K

U5189

CR73

202A27P1

201GND

1610KU396

1610KU121

U5289

C4021N5711

CR8121N5711

CR48

12120U4616

U227120U3789

U36710100K

U51710A27P1

59A27P1

196A27P1

197GND

1610KU3915

1610KU3914

U52710

C4321N5711

CR53

CR50

U38245GND

1610KU392

U226120U37710

U36611100K

U51611100K

U5216100K

U52611

C5621N5711

CR54

CR49

U381489

CR74

1610KU3913120U37611100pf

C6021

U225120U3716

U36512100K

U51512GND

1610KU391

1610KU3910

U52512

C5521N5711

CR47

CR19

U25131011

CR37

U224120U37512

U36413100K

U51413+5V

U182

48A27P1

49GND

1610KU399

1610KU398

U52413

100PF

C5421N5711

CR55

CR56

U251489

C5321

U17215100K

U4816-+LM139

U25167

C412120U37413

1610KU397

U47215GND

1610KU3931N5711

CR38

45A27P1

44GND

1610KU394

1610KU322

52GND

1610KU3911120U37215

51A27P1

203+5V

U221

U52215100K

U51215A27P1

53100K

U4716+5V

U222

1610KU324

U1716GND

1610KU3912

U25245+5V

U181

U36215

CR16

U3616100K

U5116100K

U48215A27P1

43

CR18

CR51

174

CR52

144A27P1JIJI911101110978   6REVDRAWING NO.

FSCM

SIZE6543254321HGFEDCBACBADEFGH78SHEET      OF

-D146A27P1R1610.2KR1910.2K

R2010.2K

SPARE2

123SPARE2

121311SPARE2

456SPARE2

1098+5VR1510.2K

R1710.2K

MFP+

MFP-

MLB-

RDP+

SCCLK-

RHFC-

RHFC+

MLA-

HFC+

RMFP+

FDCMLD+

MLD-

OBTC-

MLB+

OBTC+

RMFP-

HFC-

RDP-

ROBTC+

ROBTC-

SCHFC

DP-DP+RMLB-

RSCCLK-

RMLA+

RMLA-

RMLD+

RMLD-

RMLB+

RSCCLK+

MLAMLBSCCLK+

RTGL

FDO+

SC2K

RFDO+

TGL+

TGLSCDP

RTGL+

SCMF

TLM+

TLME

TLMPD

RFDC+

RTLM+

RTLM-

TLM-

MLA+

TLMRD

FDC+

FDOSCCLK

RSCCLK

P/R1

RMLA

MLDRMLD

RMLB

REV. 29 NOV 93 (R.C.)

FILE: 81105-2.SCH

42MDI081105

1      65113

SPARES

FROM SPARE2-8

FROM SPARE1-3

TO U2-15

TO U2-5

XTGL+

XTLM-

XTLM+B512U53