ITEMS:m+5ae    -  App. Elec  +5 volts; Cnv2
SEL: m+5ae
MAN: m+5ae,
SYN: m+5ae
ITEMS:m+15ae   -  App. Elec  +15 volts; Cnv2
SEL: m+15ae
MAN: m+15ae,
SYN: m+15ae
ITEMS:m+75lt   -  Limb Tracker +75 volts; Cnv2
SEL: m+75lt
MAN: m+75lt,
SYN: m+75lt
ITEMS:m+15htr  -  Heater +15 volts; Cnv2
SEL: m+15htr
MAN: m+15htr,
SYN: m+15htr
ITEMS:m+15mtr  -  Motor +15 volts; Cnv2
SEL: m+15mtr
MAN: m+15mtr,
SYN: m+15mtr
ITEMS:m+5ip    -  IP AND TLM +5 volts; Cnv1
SEL: m+5ip
MAN: m+5ip,
SYN: m+5ip
ITEMS:m+5cm    -  CCD Camera +5 volts; Cnv1
SEL: m+5cm
MAN: m+5cm,
SYN: m+5cm
ITEMS:m+15cm   -  CCD Camera +15 volts; Cnv1
SEL: m+15cm
MAN: m+15cm,
SYN: m+15cm
ITEMS:m+30cm   -  CCD Camera +30 volts;Cnv1
SEL: m+30cm
MAN: m+30cm,
SYN: m+30cm
ITEMS:m+5pc1n  -  Converter 1 +5 Volts
SEL: m+5pc1n
MAN: m+5pc1n,
SYN: m+5pc1n
ITEMS:m+5pc1r  -  Converter 1 +5 Volts
SEL: m+5pc1r
MAN: m+5pc1r,
SYN: m+5pc1r
ITEMS:m+15pc1n -  Converter 1 +15 Volts
SEL: m+15pc1n
MAN: m+15pc1n,
SYN: m+15pc1n
ITEMS:m+15pc1r -  Converter 1 +15 Volts
SEL: m+15pc1r
MAN: m+15pc1r,
SYN: m+15pc1r
ITEMS:m+5pc2n  -  Converter 2 +5 Volts
SEL: m+5pc2n
MAN: m+5pc2n,
SYN: m+5pc2n
ITEMS:m+5pc2r  -  Converter 2 +5 Volts
SEL: m+5pc2r
MAN: m+5pc2r,
SYN: m+5pc2r
ITEMS:m+15pc2n -  Converter 2 +15 Volts
SEL: m+15pc2n
MAN: m+15pc2n,
SYN: m+15pc2n
ITEMS:m+15pc2r -  Converter 2 +15 Volts
SEL: m+15pc2r
MAN: m+15pc2r,
SYN: m+15pc2r
