ITEMS:m-15ae   -  App. Elec  -15 volts; Cnv2
SEL: m-15ae
MAN: m-15ae,
SYN: m-15ae
ITEMS:m-15cm   -  CCD Camera -15 volts; Cnv1
SEL: m-15cm
MAN: m-15cm,
SYN: m-15cm
ITEMS:m-15pc1n -  Converter 1 -15 Volts
SEL: m-15pc1n
MAN: m-15pc1n,
SYN: m-15pc1n
ITEMS:m-15pc1r -  Converter 1 -15 Volts
SEL: m-15pc1r
MAN: m-15pc1r,
SYN: m-15pc1r
ITEMS:m-15pc2n -  Converter 2 -15 Volts
SEL: m-15pc2n
MAN: m-15pc2n,
SYN: m-15pc2n
ITEMS:m-15pc2r -  Converter 2 -15 Volts
SEL: m-15pc2r
MAN: m-15pc2r,
SYN: m-15pc2r
