File: cmd_if.hlp - This is the help file for the command user interface.

KEY TO SYMBOLS USED
___ __ _______ ____

(M)  Indicates a command that can be used in manual mode which means
       that it can only be executed outside of a procedure - from either
       the console command line or the command widget.
(A)  Indicates a command that can be used in automatic mode which means
       that it can only be executed from within a procedure.
