ITEMS:mkfdopn1 -  Door Open Status 1
SEL: mkfdopn1
MAN: mkfdopn1,
SYN: mkfdopn1
ITEMS:mkfdopn2 -  Door Open Status 2
SEL: mkfdopn2
MAN: mkfdopn2,
SYN: mkfdopn2
ITEMS:mkfdmtr1 -  Door Motor 1 Status
SEL: mkfdmtr1
MAN: mkfdmtr1,
SYN: mkfdmtr1
ITEMS:mkfdmtr2 -  Door Motor 2 Status
SEL: mkfdmtr2
MAN: mkfdmtr2,
SYN: mkfdmtr2
ITEMS:mkfdtime -  Door Move Time
SEL: mkfdtime
MAN: mkfdtime,
SYN: mkfdtime
ITEMS:mkfdfunc -  Door Function
SEL: mkfdfunc
MAN: mkfdfunc,
SYN: mkfdfunc
ITEMS:mkfdstat -  Door Operation Status
SEL: mkfdstat
MAN: mkfdstat,
SYN: mkfdstat
ITEMS:mkfdmove -  Door Moving Indicator
SEL: mkfdmove
MAN: mkfdmove,
SYN: mkfdmove
