ITEMS:mkhpospt -  Prime Oven Set Point
SEL: mkhpospt
MAN: mkhpospt,
SYN: mkhpospt
ITEMS:mkhpomon -  Prime Oven Monitoring
SEL: mkhpomon
MAN: mkhpomon,
SYN: mkhpomon
ITEMS:mkhpomtw -  Prime Oven Monitoring Time
SEL: mkhpomtw
MAN: mkhpomtw,
SYN: mkhpomtw
ITEMS:mkhrodbh -  Backup Oven Dead Band High
SEL: mkhrodbh
MAN: mkhrodbh,
SYN: mkhrodbh
ITEMS:mkhrodbl -  Backup Oven Dead Band Low
SEL: mkhrodbl
MAN: mkhrodbl,
SYN: mkhrodbl
ITEMS:mkhrocbh -  Backup Oven Control Band High
SEL: mkhrocbh
MAN: mkhrocbh,
SYN: mkhrocbh
ITEMS:mkhrocbl -  Backup Oven Control Band Low
SEL: mkhrocbl
MAN: mkhrocbl,
SYN: mkhrocbl
ITEMS:mkhrospt -  Backup Oven Set Point
SEL: mkhrospt
MAN: mkhrospt,
SYN: mkhrospt
ITEMS:mkhrocpt -  Backup Oven Control Point
SEL: mkhrocpt
MAN: mkhrocpt,
SYN: mkhrocpt
ITEMS:mkhcmspt -  CCD Heater Set Point
SEL: mkhcmspt
MAN: mkhcmspt,
SYN: mkhcmspt
ITEMS:mkhromon -  Backup Oven Monitoring
SEL: mkhromon
MAN: mkhromon,
SYN: mkhromon
ITEMS:mkhoph2  -  Optics Package Heater 2 On/Off
SEL: mkhoph2
MAN: mkhoph2,
SYN: mkhoph2
ITEMS:mkhoph3  -  Optics Package Heater 3 On/Off
SEL: mkhoph3
MAN: mkhoph3,
SYN: mkhoph3
ITEMS:mkhopspt -  Optics Package Heater Set Point
SEL: mkhopspt
MAN: mkhopspt,
SYN: mkhopspt
