ITEMS:enable  -  (M,A) Enable limit checking for 1 or all parameters
SEL:enable
MAN:enable,
SYN:ena[ble] all | par_name
ITEMS:expect  -  (M,A) Set an expected status text strfor a digital parameter
SEL:expect
MAN:expect,
SYN:exp[ect] par_name  "string"  count
ITEMS:getint  -  (M,A) Get and display/store counter or register parm. value
SEL:getint
MAN:getint,
SYN:geti[nt] par_name
ITEMS:getmon  -  (M,A) Get and display/store the limit monitoring state
SEL:getmon
MAN:getmon,
SYN:getm[on] par_name
ITEMS:getraw  -  (M,A) Get and display/store a raw parameter value
SEL:getraw
MAN:getraw,
SYN:getraw par_name
ITEMS:getreal -  (M,A) Get and display/store an analog parameter value
SEL:getreal
MAN:getreal,
SYN:getr[eal] par_name
ITEMS:inhibit -  (M,A) Inhibit limit checking for 1 or all parameters
SEL:inhibit
MAN:inhibit,
SYN:inhi[bit] all | par_name
ITEMS:limit   -  (M,A) Set limit checking parameters for a database parameter
SEL:limit
MAN:limit,
SYN:li[mit] par_name [a_l r_l r_h a_h count]  |  [-c r_delta a_delta count]
ITEMS:patch   -  (M)   Change database parameters
SEL:patch
MAN:patch,
SYN:pa[tch] [calib | curve | loc | action] (See Manual Page for options)
ITEMS:report  -  (M,A) Display detailed limit messages for a parameter
SEL:report
MAN:report,
SYN:rep[ort]  on | off   all | par_name
ITEMS:setpat  -  (M,A) Set a pattern to compare against a telemetry packet
SEL:setpat
MAN:setpat,
SYN:setp[at] hk1|hk2|sc1|sc2|sc4|sci5k|sci160k   start stop base
ITEMS:table   -  (M)   Display a database table
SEL:table
MAN:table,
SYN:ta[ble] ootc|blktc|parm|tx|ca|pd_de|pd_co|pca|pc_di|dct|resp|status|dpc
ITEMS:tmpat   -  (M,A) Enable compare of a pattern against a telemetry packet
SEL:tmpat
MAN:tmpat,
SYN:tmp[at] hk1|hk2|sc1|sc2|sc4|sci5k|sci160k    on | off
