ITEMS:mxhporef -  Temperature Sensor Reference
SEL: mxhporef
MAN: mxhporef,
SYN: mxhporef
ITEMS:mxam1pos -  Leg Potentiometer Wiper 1
SEL: mxam1pos
MAN: mxam1pos,
SYN: mxam1pos
ITEMS:mxam2pos -  Leg Potentiometer Wiper 2
SEL: mxam2pos
MAN: mxam2pos,
SYN: mxam2pos
ITEMS:rxspe1   -  B-TRSP1 RX PLL Static Phase Err
SEL: rxspe1
MAN: rxspe1,
SYN: rxspe1
ITEMS:rxspe2   -  B-TRSP2 RX PLL Static Phase Err
SEL: rxspe2
MAN: rxspe2,
SYN: rxspe2
