200,000 km

496,000 km

nuclear-fusion core 1.57 10^7 K convection zone 2.2 10^6 K solar surface 5.6 10^3 K

1,000 2,000 3,000 4,000 depth, km

0 50,000 horizontal distance, km

1 km/s

convective plumes

150,000

Convective Flows Below The Sun’s Surface

=

0

Temperature change

-3% +3%

×

×

×

100,000

5,000 6,000 7,000

-_|